Duplex Mode

This setting configures the network adapter for half or full duplex operation.

In half duplex operation, the adapter can only transmit or receive packets at any one time. In full duplex, the adapter can transmit and receive at the same time, theoretically doubling throughput to 20Mb/s.

Important Note: Verify the link partner, i.e. the switch, hub, or other network interface card is set to the same duplex setting as the AT-2400.